45 50 55 60 65 70 75 80 85 90 95 100 105 110 115 120 250 300 350 400 450 500 550 600 650 700 Common data = 25.7%

Slough data only = 5.89% Chilton data only = 6.61% Neither = 61.81%

Day Number h’F2

Statistics apply to days when both instruments were operating