152 157 162 167 172 177 182 187 90

100

110

120

130

140

150

160

170

180

190 Common data = 75.11%

Slough data only = 9.35% Chilton data only = 1.63% Neither = 13.91%

Day Number h’Es

Statistics apply to days when both instruments were operating